%\magnification=\magstep2
\hsize=6.25truein
\hoffset=0.25truein
\vsize=9.0truein
%\voffset=0.5truein
\font\insfont=cmr10  scaled\magstephalf
\font\disfont=cmbx10  scaled\magstephalf
\font\volfont=cmbx10 scaled\magstep3
\font\datfont=cmbx10 scaled\magstep3
\font\titfont=cmbx10 scaled\magstep4

\nopagenumbers

\hbox to \hsize{\disfont \hfil UCSD-ENG-004}
%\medskip
%\hbox to \hsize{\disfont \hfil Volume I}
\vskip 2.0truein
\centerline{\titfont STELLARATOR }
\bigskip
\centerline{\titfont POWER~PLANT~STUDY }
\vskip 0.75truein
\centerline{\datfont FINAL~REPORT }
\bigskip
\centerline{\datfont 1997 }
\vskip 1.50truein
\insfont
\hbox to \hsize{University of California, Los Angeles \hfil
University of California, San Diego}

\hbox to \hsize{Institute of Plasma and Fusion Research \hfil
Fusion Energy Research Program }

\hbox to \hsize{Los Angeles, CA \hfil
La Jolla, CA}

\hbox to \hsize{\hfil}

\hbox to \hsize{Argonne National Laboratory \hfil
Idaho National Engineering Laboratory}

\hbox to \hsize{Argonne, IL \hfil Idaho Falls, ID}

\hbox to \hsize{\hfil}

\hbox to \hsize{New York University \hfil
Oak Ridge National Laboratory}

\hbox to \hsize {New York, NY \hfil Oak Ridge, TN}

\hbox to \hsize{\hfil}

\hbox to \hsize {Princeton Plasma Physics Laboratory \hfil
Westinghouse Electric Corporation}

\hbox to \hsize{Princeton, NJ \hfil Science \& Technology Center}

\hbox to \hsize{\hfil
Pittsburgh, PA}

\hbox to \hsize{\hfil}

\hbox to \hsize {General Atomics \hfil
University of Wisconsin}

\hbox to \hsize{San Diego, CA \hfil Madison, WI}

\hbox to \hsize{\hfil}

\hbox to \hsize{Los Alamos National Laboratory \hfil }

\hbox to \hsize{Los Alamos, NM \hfil }

\vfil\eject
\hsize=5.75truein
\hoffset=0.5truein
\centerline{\hfil}
\vskip 6.truein
\centerline{\disfont DISCLAIMER}

This report was prepared as an account of work sponsored by an agency of the
United States Government.  Neither the United States Government nor any agency
thereof, nor any of their employees, makes any warranty, express or implied, or
assumes any legal liability or responsibility for the accuracy, completeness,
or usefulness of any information, apparatus, product, or process disclosed, or
represents that its use would not infringe on privately owned rights.
Reference herein to any specific commercial product, process, or service by
trade name, trademark, manufacturer, or otherwise, does not necessarily
constitute or imply its endorsement, recommendation, or favoring by the United
States Government or any agency thereof.  The views and opinions of authors
expressed herein do not necessarily state or reflect those of the United States
Government or any agency thereof.

\vfil\eject

\bye
