% Draft for Review 97/06/13
%
\documentclass[12pt,twoside]{report}
\usepackage{aries97}
\usepackage{ariesref}
\usepackage{psfig}
\usepackage{rotating}
\usepackage{cite}

\newcommand{\gesim}{\mathrel{\vcenter{\hbox{$\buildrel>\over\sim$}}}}
\newcommand{\lesim}{\mathrel{\vcenter{\hbox{$\buildrel<\over\sim$}}}}
\newcommand{\HT}{\hbox{HT-9}}
\newcommand{\X}{\times}
\newcommand{\ARS}{\hbox{ARIES-RS}}
\newcommand{\AIIoIV}{\hbox{ARIES-II/IV}}
\newcommand{\AII}{\hbox{ARIES-II}}
\newcommand{\AI}{\hbox{ARIES-I}}
\newcommand{\AIII}{\hbox{ARIES-III}}

\renewcommand{\thechapter}{A}
\renewcommand{\leftmark}{APPENDIX}

\begin{document}

\title{\bf Appendix}
\author{\hbox to \hsize
{ \hbox to 2.truein{             \hfil } \hfil
  \hbox to 2.truein{\hfil Ronald L. Miller \hfil } \hfil
  \hbox to 2.truein{\hfil                      } } \\ }
\date{ }
\maketitle

\begin{titlepage}
{%\baselineskip=1.8ex
\tableofcontents
}
\end{titlepage}

\setcounter{page}{1}

\chapter{Appendix}

\section{ARIES-Systems-Code General Parameters}
\label{a-1}

The following output is a partial listing of the general engineering and
economic parameters describing the SPPS/MHH reference design as generated by
the ARIES Systems Code (ASC$^{\star}$).
%These ASC-generated results may differ from results of more
%detailed calculations appearing elsewhere in this report, but the differences
%should be small.
\clearpage

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out1.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-1}
\end{figure}

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out2.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-2}
\end{figure}

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out3.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-3}
\end{figure}

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out4.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-4}
\end{figure}

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out5.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-5}
\end{figure}

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out6.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-6}
\end{figure}

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out7.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-7}
\end{figure}

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out8.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-8}
\end{figure}

\begin{figure}[p]
\centerline{\hbox{
\psfig{file=out9.ps,width=6.25truein,bbllx=54pt,bblly= 72pt,%
        bburx=558pt,bbury=720pt}
}}
\label{f-A-9}
\end{figure}

\clearpage

\section{ARIES-Systems-Code Cost Summary}
\label{a-2}

The following output is a complete listing of the cost accounts
for the SPPS/MHH reference design as generated by the ARIES Systems Code
(ASC$^{\star}$).
\clearpage

% The ps files whre created by:
% 1) Editing the first two line off ...html file (<pre> and the blank line
%    after that)
% 2) Running enscript -s 0 -r -B -p ??.ps ??.html
% 3) For some reason sideays figure insists that all pages are left hand pages
%    and therefore does not rotate pages properly in this file.  So had to
%    rotate them manually (i.e, through angle=180 in \psfig).

\begin{figure}[p]
\vspace{-2in}\psfig{file=ac01.ps,height=10in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-2in}\psfig{file=ac02.ps,height=10in}
%\hspace{-0.5in}\psfig{file=ac02.ps,height=10in,angle=180}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-2in}\psfig{file=ac03.ps,height=10in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-2in}\psfig{file=ac04.ps,height=10in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-2in}\psfig{file=ac05.ps,height=10in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-2in}\psfig{file=ac06.ps,height=10in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-2in}\psfig{file=ac07.ps,height=10in}
\end{figure}
\clearpage


\begin{figure}[p]
\vspace{-2in}\psfig{file=ac08.ps,height=10in}
\end{figure}
\clearpage

\section{ARIES-Systems-Code Cost Database}
\label{a-3}

The following output is a complete listing of the cost database
for the SPPS/MHH reference design as generated by the ARIES Systems Code
(ASC$^{\star}$).

\clearpage

\begin{figure}[p]
\vspace{-0.5in}\psfig{file=a401.ps,height=8.5in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-0.5in}\psfig{file=a402.ps,height=8.5in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-0.5in}\psfig{file=a403.ps,height=8.5in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-0.5in}\psfig{file=a404.ps,height=8.5in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-0.5in}\psfig{file=a405.ps,height=8.5in}
\end{figure}
\clearpage

\begin{figure}[p]
\vspace{-0.5in}\psfig{file=a406.ps,height=8.5in}
\end{figure}
\clearpage

\end{document}
\bye
