Magnetic field distribution

Coil system MHH-A: Magnetic field distribution of the first quadrant in the plane z = 0. Left: contour plot of the magnitudes, right: the same as a 3D-plot.

Coil system MHH-A: Magnetic field distribution near the coils 1 and 32 in the plane z = 0. Left: contour plot of the magnitudes, right: the same as a 3D-plot.