 23. 1. 1.        turbine-generators & accessories
 23. 1. 2.        foundations
 23. 1. 3.        standby exciters
 23. 1. 4.        lubricating system
 23. 1. 5.        gas systems
 23. 1. 6.        reheaters
 23. 1. 7.        shielding
 23. 1. 8.        weather-proof housing
 23. 1.         turbine-generators                                                  215.934

 23. 2.         misc. turbine-generator equipment

 23. 3. 1.        water intake common facilities
 23. 3. 2.        circulating water systems
 23. 3. 3.        cooling towers
 23. 3. 4.        other systems which reject heat to the atmosphere
 23. 3.         heat rejection systems                                               33.050

 23. 4. 1.        condensers
 23. 4. 2.        condensate system
 23. 4. 3.        gas removal system
 23. 4. 4.        turbine by-pass systems(excl. piping)
 23. 4.         condensing systems

 23. 5. 1.        regenerators & recuporators
 23. 5. 2.        pumps
 23. 5. 3.        tanks
 23. 5.         feed heating system

 23. 6. 1.        turbine auxiliaries
 23. 6. 2.        auxiliaries cooling system(excl. piping)
 23. 6. 3.        make-up treat. system(excl. piping)
 23. 6. 4.        chemical treat. & condensate purification systems
 23. 6. 5.        central lubrication service system(excl. piping)
 23. 6.         other turbine plant equipment

 23. 7.         instrumentation & control(i&c) equipment

 23.98.         spare parts allowance                                                 4.980
 23.99.         contingency allowance

 23.          turbine plant equipment                                                         253.964

 24. 1. 1.        generator circuits
 24. 1. 2.        station service
 24. 1.         switchgear