 21. 7.         ventilation stack                                                     1.974

 21.98.         spare parts allowance                                                 6.521
 21.99.         contingency allowance

 21.          structures & site facilities                                                    332.546

 22. 1. 1. 1.        first wall (FW)                                     5.395
 22. 1. 1. 2.        wall modifiers(coatings, liners, limiters, etc.)
 22. 1. 1. 3.        blanket (structure, breeder, n-multiplier, etc.)   66.088
 22. 1. 1. 4.        reflector
 22. 1. 1. 5.        manifolds
 22. 1. 1. 6.        other
 22. 1. 1.        FW/blanket/reflector                                         71.483
 22. 1. 2. 1.        primary                                           289.804
 22. 1. 2. 2.        secondary                                           0.000
 22. 1. 2.        shield                                                      289.804
 22. 1. 3. 1.        toroidal field coils                              389.556
 22. 1. 3. 2.        ohmic-heating coils                                 0.000
 22. 1. 3. 3.        equilibrium field coils                             0.000
 22. 1. 3. 4.        divertor field coils                                0.000
 22. 1. 3. 5.        other coils
 22. 1. 3.        magnets                                                     389.556
 22. 1. 4. 1.        beam heating(neutral, ion or electron)              0.000
 22. 1. 4. 2.        rf heating                                         54.194
 22. 1. 4. 3.        laser heating
 22. 1. 4. 4.        other heating systems
 22. 1. 4.        supplemental-heating/CD systems                              54.194
 22. 1. 5. 1.        reactor structure
 22. 1. 5. 2.        equipment support structure
 22. 1. 5.        primary structure & support                                 152.935
 22. 1. 6. 1.        plasma chamber vacuum(incl. pumps/comp./pipe)      13.986
 22. 1. 6. 2.        magnet dewar vacuum(incl. pumps/comp./pipe)
 22. 1. 6. 3.        suppl. heating vacuum(incl. pumps/comp./pipe)
 22. 1. 6. 4.        direct convertor vacuum(incl. pumps/comp./pipe)
 22. 1. 6. 5.        reactor vacuum system(low grade)
 22. 1. 6. 6.        reactor vacuum wall                                71.395
 22. 1. 6. 7.        reactor vacuum tank/enclosure
 22. 1. 6.        reactor vacuum systems(unless integral elsewhere)            85.381
 22. 1. 7. 1.        EF-coil power supplies
 22. 1. 7. 2.        OH-coil power supplies
 22. 1. 7. 3.        TF-coil power supplies
 22. 1. 7. 4.        DF-coil power supplies
 22. 1. 7. 5.        other power supplies                                1.537
 22. 1. 7. 6.        current drive power supplies                        0.000
 22. 1. 7. 7.        control system
 22. 1. 7. 8.        central energy storage
 22. 1. 7. 9.        other incl. busbars                                53.785
 22. 1. 7.        power supply, switching & energy storage                     55.322
 22. 1. 8.        impurity control                                             12.015