 25  1  1  0      cranes, hoists, monorails, & conveyors                  0.9000   0.000E+00             1.000E+00
 25  1  2  0      railway                                                 0.9000   0.000E+00             1.000E+00
 25  1  3  0      roadway equipment                                       0.9000   0.000E+00             1.000E+00
 25  1  4  0      watercraft                                              0.9000   0.000E+00             1.000E+00
 25  1  5  0      vehicle maintenance equipment                           0.9000   0.000E+00             1.000E+00
 25  1  0  0    transportation & lifting equipment                        0.9000   0.000E+00             1.000E+00
 25  2  1  0      air systems(excl. piping)                               0.9000   0.000E+00             1.000E+00
 25  2  2  0      water systems(excl. piping)                             0.9000   0.000E+00             1.000E+00
 25  2  3  0      auxiliary heating boilers(excl. piping)                 0.9000   0.000E+00             1.000E+00
 25  2  0  0    air & water service systems                               0.9000   0.000E+00             1.000E+00
 25  3  1  0      local communications systems                            0.9000   0.000E+00             1.000E+00
 25  3  2  0      signal systems                                          0.9000   0.000E+00             1.000E+00
 25  3  0  0    communications equipment                                  0.9000   0.000E+00             1.000E+00
 25  4  1  0      safety equipment                                        0.9000   0.000E+00             1.000E+00
 25  4  2  0      shop, laboratory, & test equipment                      0.9000   0.000E+00             1.000E+00
 25  4  3  0      office equipment & furnishings                          0.9000   0.000E+00             1.000E+00
 25  4  4  0      change room equipment                                   0.9000   0.000E+00             1.000E+00
 25  4  5  0      environmental monitoring equipment                      0.9000   0.000E+00             1.000E+00
 25  4  6  0      dining facilities                                       0.9000   0.000E+00             1.000E+00
 25  4  0  0    furnishings & fixtures                                    0.9000   0.000E+00             1.000E+00
 25 98  0  0    spare parts allowance                                     0.9000   3.000E-02 fraction   -1.000E+00  2,13,14
 25 99  0  0    contingency allowance                                     0.9000   0.000E+00 fraction   -1.000E+00  2,13,14
 25  0  0  0  miscellaneous plant equipment                               0.9000   3.248E-02 $/Weg       1.086E+09 30+spare
 26  1  0  0    reactor coolant                                           1.0000   2.851E+01 $/kg        4.368E+05 15,18
 26  2  0  0    intermediate coolant                                      1.0000   0.000E+00             1.000E+00
 26  3  0  0    turbine cycle working fluids                              1.0000   0.000E+00             1.000E+00
 26  4  0  0    other materials                                           1.0000   2.500E+05 $           1.000E+00 13,14
 26  5  0  0    Ar reactor-building cover gas                             1.0000   7.500E-01 $/m^3       2.328E+05
 26 98  0  0    spare parts allowance                                     1.0000   0.000E+00 fraction   -1.000E+00
 26 99  0  0    contingency allowance                                     1.0000   0.000E+00 fraction   -1.000E+00
 26  0  0  0  special materials                                           1.0000   0.000E+00             1.000E+00
 90  0  0  0 direct cost (not including contingency)                      1.0000   0.000E+00             1.000E+00
 91  0  0  0  construction services & equipment                           1.0000   1.200E-01 fraction   -1.000E+00 4,10
 92  1  0  0    systems engineering                                       1.0000   0.000E+00            -1.000E+00
 92  2  0  0    management                                                1.0000   0.000E+00            -1.000E+00
 92  3  0  0    quality assurance                                         1.0000   0.000E+00            -1.000E+00
 92  4  0  0    safety & environmental engineering                        1.0000   0.000E+00            -1.000E+00
 92  0  0  0  home office engineering & services                          1.0000   5.200E-02 fraction   -1.000E+00 4,10
 93  1  0  0    construction management                                   1.0000   0.000E+00            -1.000E+00
 93  2  0  0    inspection                                                1.0000   0.000E+00            -1.000E+00
 93  3  0  0    preoperational testing                                    1.0000   0.000E+00            -1.000E+00
 93  0  0  0  field office engineering & services                         1.0000   6.000E-02 fraction   -1.000E+00 4,10
 94  1  0  0    project administration                                    1.0000   0.000E+00            -1.000E+00
 94  2  0  0    staff training & plant startup                            1.0000   0.000E+00            -1.000E+00
 94  3  0  0    inventories & spares                                      1.0000   0.000E+00            -1.000E+00
 94  0  0  0  owner’s cost                                                1.0000   1.848E-01 fraction   -1.000E+00 4,10
 95  0  0  0  process contingency                                         1.0000   0.000E+00 fraction   -1.000E+00 4,10
 96  0  0  0  project contingency                                         1.0000   2.391E-01 fraction   -1.000E+00 4,10
 97  0  0  0  interest during construction (IDC)                          1.0000   1.652E-01 fraction   -1.000E+00 4,10
 98  0  0  0  escalation during construction (EDC)                        1.0000   0.000E+00 fraction   -1.000E+00 4,10
 99  0  0  0 total cost                                                   1.0000   0.000E+00            (1.000E+09 We)