 22  2  1  6        thermal insulation, piping & equipment                1.0000   0.000E+00             1.000E+00
 22  2  1  7        tritium extraction                                    1.0000   0.000E+00             1.000E+00
 22  2  1  8        pressurizer                                           1.0000   0.000E+00             1.000E+00
 22  2  1  9        other                                                 1.0000   0.000E+00             1.000E+00
 22  2  1  0      primary coolant system                                  1.0000   4.943E-02 $/Wth       2.293E+09 10
 22  2  2  1        pumps & motor drives(modular & nonmodular)            1.0000   0.000E+00             1.000E+00
 22  2  2  2        piping                                                1.0000   0.000E+00             1.000E+00
 22  2  2  3        heat exchangers                                       1.0000   0.000E+00             1.000E+00
 22  2  2  4        tanks(dump,make-up,clean-up,trit.,hot storage)        1.0000   0.000E+00             1.000E+00
 22  2  2  5        clean-up system                                       1.0000   0.000E+00             1.000E+00
 22  2  2  6        thermal insulation, piping & equipment                1.0000   0.000E+00             1.000E+00
 22  2  2  7        tritium extraction                                    1.0000   0.000E+00             1.000E+00
 22  2  2  8        pressurizer                                           1.0000   0.000E+00             1.000E+00
 22  2  2  9        other                                                 1.0000   0.000E+00             1.000E+00
 22  2  2  0      intermediate coolant system                             1.0000   8.634E-03 $/Wth       2.293E+09 10
 22  2  3  1        pumps & motor drives(modular & nonmodular)            1.0000   0.000E+00             1.000E+00
 22  2  3  2        piping                                                1.0000   0.000E+00             1.000E+00
 22  2  3  3        heat exchangers                                       1.0000   0.000E+00             1.000E+00
 22  2  3  4        tanks(dump,make-up,clean-up,trit.,hot storage)        1.0000   0.000E+00             1.000E+00
 22  2  3  5        clean-up system                                       1.0000   0.000E+00             1.000E+00
 22  2  3  6        thermal insulation, piping & equipment                1.0000   0.000E+00             1.000E+00
 22  2  3  7        tritium extraction                                    1.0000   0.000E+00             1.000E+00
 22  2  3  8        pressurizer                                           1.0000   0.000E+00             1.000E+00
 22  2  3  9        other                                                 1.0000   0.000E+00             1.000E+00
 22  2  3  0      secondary coolant system                                1.0000   2.819E+00 $/Wth       2.293E+04 10
 22  2  4  0      thermal storage system                                  1.0000   0.000E+00 $/s         0.000E+00 31
 22  2  0  0    main heat transfer & transport systems                    1.0000   0.000E+00             1.000E+00
 22  3  1  1        refrigeration                                         0.9400   7.546E+01 $/unit      1.290E-02 23
 22  3  1  2        piping                                                0.9400   0.000E+00             1.000E+00
 22  3  1  3        fluid circulation driving system                      0.9400   0.000E+00             1.000E+00
 22  3  1  4        tanks                                                 0.9400   0.000E+00             1.000E+00
 22  3  1  5        purification                                          0.9400   0.000E+00             1.000E+00
 22  3  1  0      magnet cooling system                                   0.9400   0.000E+00             1.000E+00
 22  3  2  1        refrigeration                                         0.9400   0.000E+00             1.000E+00
 22  3  2  2        piping                                                0.9400   0.000E+00             1.000E+00
 22  3  2  3        fluid circulation driving system                      0.9400   0.000E+00             1.000E+00
 22  3  2  4        tanks                                                 0.9400   0.000E+00             1.000E+00
 22  3  2  5        purification                                          0.9400   0.000E+00             1.000E+00
 22  3  2  0      shield & structure cooling system                       0.9400   6.700E-04 $/Wth       2.293E+09 13
 22  3  3  1        refrigeration                                         0.9400   0.000E+00             1.000E+00
 22  3  3  2        piping                                                0.9400   0.000E+00             1.000E+00
 22  3  3  3        fluid circulation driving system                      0.9400   0.000E+00             1.000E+00
 22  3  3  4        tanks                                                 0.9400   0.000E+00             1.000E+00
 22  3  3  5        purification                                          0.9400   0.000E+00             1.000E+00
 22  3  3  0      supplemental heating system cooling system              0.9400   0.000E+00             1.000E+00
 22  3  4  1        refrigeration                                         0.9400   0.000E+00             1.000E+00
 22  3  4  2        piping                                                0.9400   0.000E+00             1.000E+00
 22  3  4  3        fluid circulation driving system                      0.9400   0.000E+00             1.000E+00
 22  3  4  4        tanks                                                 0.9400   0.000E+00             1.000E+00
 22  3  4  5        purification                                          0.9400   0.000E+00             1.000E+00
 22  3  4  0      power supply cooling system                             0.9400   0.000E+00             1.000E+00