 22  1  1  5        manifolds                                             0.9500   0.000E+00             1.000E+00
 22  1  1  6        other                                                 0.9500   0.000E+00             1.000E+00
 22  1  1  0      FW/blanket/reflector                                    0.9500   0.000E+00             1.000E+00
 22  1  2  1        primary                                               0.9500   1.974E+01 $/kg        9.453E+06 10
 22  1  2  2        secondary                                             0.9500   1.974E+01 $/kg        0.000E+00 10
 22  1  2  0      shield                                                  0.9500   0.000E+00             1.000E+00
 22  1  3  1        toroidal field coils                                  0.9500   5.985E+01 $/kg        4.191E+06 10
 22  1  3  2        ohmic-heating coils                                   0.9500   5.000E+01 $/kg        0.000E+00 10
 22  1  3  3        equilibrium field coils                               0.9500   5.000E+01 $/kg        0.000E+00 10
 22  1  3  4        divertor field coils                                  0.9500   5.000E+01 $/kg        0.000E+00 10
 22  1  3  5        other coils                                           0.9500   0.000E+00             1.000E+00
 22  1  3  0      magnets                                                 0.9500   0.000E+00             1.000E+00
 22  1  4  1        beam heating(neutral, ion or electron)                0.9400   2.110E+00 $/W         0.000E+00 28+
 22  1  4  2        rf heating                                            0.9400   1.745E+00 $/W         2.021E+07 28+
 22  1  4  3        laser heating                                         0.9400   0.000E+00             1.000E+00
 22  1  4  4        other heating systems                                 0.9400   0.000E+00             1.000E+00
 22  1  4  0      supplemental-heating/CD systems                         0.9400   0.000E+00             1.000E+00
 22  1  5  1        reactor structure                                     0.9400   0.000E+00             1.000E+00
 22  1  5  2        equipment support structure                           0.9400   0.000E+00             1.000E+00
 22  1  5  0      primary structure & support                             0.9400   1.855E+01 $/kg        5.365E+06 28
 22  1  6  1        plasma chamber vacuum(incl. pumps/comp./pipe)         0.9400   6.985E+04 $/m^3/s     1.303E+02 26
 22  1  6  2        magnet dewar vacuum(incl. pumps/comp./pipe)           0.9400   0.000E+00             1.000E+00
 22  1  6  3        suppl. heating vacuum(incl. pumps/comp./pipe)         0.9400   0.000E+00             1.000E+00
 22  1  6  4        direct convertor vacuum(incl. pumps/comp./pipe)       0.9400   0.000E+00             1.000E+00
 22  1  6  5        reactor vacuum system(low grade)                      0.9400   0.000E+00             1.000E+00
 22  1  6  6        reactor vacuum wall                                   0.9400   2.140E+01 $/kg        2.171E+06
 22  1  6  7        reactor vacuum tank/enclosure                         0.9400   0.000E+00             1.000E+00
 22  1  6  0      reactor vacuum systems(unless integral elsewhere)       0.9400   0.000E+00             1.000E+00
 22  1  7  1        EF-coil power supplies                                0.9400   1.223E+01 $/kVA       1.000E-02 10
 22  1  7  2        OH-coil power supplies                                0.9400   1.855E+01 $/kVA       1.000E-02 10
 22  1  7  3        TF-coil power supplies                                0.9400   3.709E+01 $/kVA       1.000E-09 10
 22  1  7  4        DF-coil power supplies                                0.9400   3.709E+01 $/kVA       1.000E-06 10
 22  1  7  5        other power supplies                                  0.9400   1.000E+06             1.000E+00
 22  1  7  6        current drive power supplies                          0.9400   3.709E+01 $/kVAr      0.000E+00 10
 22  1  7  7        control system                                        0.9400   0.000E+00             1.000E+00
 22  1  7  8        central energy storage                                0.9400   0.000E+00             1.000E+00
 22  1  7  9        other incl. busbars                                   0.9400   3.500E+07 $           1.000E+00
 22  1  7  0      power supply, switching & energy storage                0.9400   0.000E+00             1.000E+00
 22  1  8  0      impurity control                                        0.9400   4.450E+04 $/m^2       1.757E+02 10
 22  1  9  1        vacuum tank                                           0.9400   0.000E+00             1.000E+00
 22  1  9  2        direct convertor modules                              0.9400   0.000E+00             1.000E+00
 22  1  9  3        thermal panels                                        0.9400   0.000E+00             1.000E+00
 22  1  9  4        power conditioning equipment                          0.9400   0.000E+00             1.000E+00
 22  1  9  0      direct energy conversion system                         0.9400   0.000E+00 $/W         0.000E+00
 22  1 10  0      ecrh breakdown system                                   0.9400   2.820E+06 $           1.000E+00 13
 22  1  0  0    reactor equipment                                         0.9400   0.000E+00             1.000E+00
 22  2  1  1        pumps & motor drives(modular & nonmodular)            1.0000   0.000E+00             1.000E+00
 22  2  1  2        piping                                                1.0000   0.000E+00             1.000E+00
 22  2  1  3        heat exchangers                                       1.0000   0.000E+00             1.000E+00
 22  2  1  4        tanks(dump,make-up,clean-up,trit.,hot storage)        1.0000   0.000E+00             1.000E+00
 22  2  1  5        clean-up system                                       1.0000   0.000E+00             1.000E+00