                                                   cost data base (ver. 10.1) LSA=2

   Acc. #                 Account Title  UC(1992) = 1.6348 x UC(1980)   LSA factor unit cost(1980)       # of units   refs.

 20  1  0  0    land & privilege acquisition                              1.0000   0.000E+00             1.000E+00
 20  2  0  0    relocation of buildings, utilities, highways, etc.        1.0000   0.000E+00             1.000E+00
 20  0  0  0  land & land rights                                          1.0000   6.385E+03 $/acre      1.000E+03 28
 21  1  1  0      general yard improvements                               1.0000   0.000E+00             1.000E+00
 21  1  2  0      waterfront improvements                                 1.0000   0.000E+00             1.000E+00
 21  1  3  0      transportation access (off site)                        1.0000   0.000E+00             1.000E+00
 21  1  0  0    site improvements & facilities                            1.0000   1.128E+07 $           1.000E+00 10
 21  2  1  0      basic building structures                               0.9000   3.725E+02 $/m^3       2.328E+05 30
 21  2  2  0      building services                                       0.9000   2.000E+06 $           1.000E+00 13,14,+
 21  2  3  0      containment structures                                  0.9000   0.000E+00 $           1.000E+00 30
 21  2  4  0      architectural                                           0.9000   7.500E+06 $           1.000E+00 13,14,+
 21  2  0  0    reactor building                                          0.9000   0.000E+00             1.000E+00
 21  3  1  0      basic building structures                               1.0000   1.610E-02 $/Weg       1.055E+09 32
 21  3  2  0      building services                                       1.0000   2.000E+06 $           1.000E+00 13,14,+
 21  3  3  0      architectural                                           1.0000   1.500E+06 $           1.000E+00 13
 21  3  0  0    turbine building                                          1.0000   0.000E+00             1.000E+00
 21  4  1  0      intake structures                                       0.6670   0.000E+00             1.000E+00
 21  4  2  0      discharge structures                                    0.6670   0.000E+00             1.000E+00
 21  4  3  0      unpressurized intake & discharge conduits               0.6670   0.000E+00             1.000E+00
 21  4  4  0      recirculating structures                                0.6670   0.000E+00             1.000E+00
 21  4  5  0      cooling tower systems                                   0.6670   0.000E+00             1.000E+00
 21  4  0  0    cooling system structures                                 0.6670   6.874E-03 $/Weg       1.055E+09  2,13,14
 21  5  1  0      basic building structures                               0.6670   8.030E+06 $           1.000E+00 13,14
 21  5  2  0      building services                                       0.6670   5.300E+05 $           1.000E+00 13,14
 21  5  3  0      architectural                                           0.6670   6.000E+05 $           1.000E+00 13
 21  5  0  0    power supply & energy storage building                    0.6670   0.000E+00             1.000E+00
 21  6  1  0      reactor auxiliaries building(incl. switchgear bay)      0.6670   3.260E+06 $           1.000E+00 13,14
 21  6  2  0      hot cell building                                       0.9000   5.369E+07 $           1.000E+00 13,14
 21  6  3  0      fuel storage building                                   0.9000   8.630E+06 $           1.000E+00 13,14
 21  6  4  0      control room building                                   1.0000   3.100E+06 $           1.000E+00 13,14
 21  6  5  0      diesel generator building                               1.0000   2.050E+06 $           1.000E+00 13,14
 21  6  6  0      administration building                                 1.0000   8.700E+05 $           1.000E+00 13,14
 21  6  7  0      service building                                        1.0000   1.880E+06 $           1.000E+00 13,14
 21  6  8  0      cryogenics building                                     1.0000   9.100E+05 $           1.000E+00 13,14
 21  6  9  0      miscellaneous structures & building work                1.0000   1.840E+06 $           1.000E+00 13,14
 21  6 10  0      thermal storage building                                0.9000   0.000E+00 $/s         0.000E+00 31
 21  6  0  0    miscellaneous buildings                                   0.6670   0.000E+00             1.000E+00
 21  7  0  0    ventilation stack                                         0.6670   1.810E+06 $           1.000E+00 13,14
 21 98  0  0    spare parts allowance                                     0.6670   2.000E-02 fraction   -1.000E+00  2,13,14
 21 99  0  0    contingency allowance                                     0.6670   0.000E+00 fraction   -1.000E+00  2,13,14
 21  0  0  0  structures & site facilities                                0.6670   0.000E+00             1.000E+00
 22  1  1  1        first wall (FW)                                       0.9500   1.835E+02 $/kg        1.893E+04
 22  1  1  2        wall modifiers(coatings, liners, limiters, etc.)      0.9500   0.000E+00             1.000E+00
 22  1  1  3        blanket (structure, breeder, n-multiplier, etc.)      0.9500   1.835E+02 $/kg        2.319E+05
 22  1  1  4        reflector                                             0.9500   0.000E+00             1.000E+00